0.00.20.40.60.81.0

(x10^4)

(x10^{-2})

Group #1: 1D internal astrometric errors AXIS1 [pixels]

ΔAXIS1 ["]

ΔAXIS2 ["]

4000

6000

8000

AXIS2 [pixels]