.help frame Jan86 images.tv.iis
.ih
NAME
frame -- select frame to be displayed on the image display
.ih
USAGE
frame frame
.ih
PARAMETERS
.ls frame
Frame to be displayed.
.le
.ih
DESCRIPTION
The specified frame is displayed on the image display monitor ("stdimage").
.ih
EXAMPLES
To display frame 3:

	cl> frame 3
.ih
SEE ALSO
cv
.endhelp
