.help msplot Oct85 noao.twodspec.multispec
.ih
NAME
msplot -- Plot data and model image line
.ih
USAGE
msplot image line
.ih
PARAMETERS
.ls image
Image to be plotted.
.le
.ls line
The image line to be plotted.  Actually the nearest sample line will be
plotted.
.le
.ls naverage = 20
Number of image lines to average about the specified line.
.le
.ls lower = -10., upper = 10.
Limits of the model profiles relative to the center of each profile.
.le
.ls graphics = "stdgraph"
Graphics output device.
.le
.ls cursor = ""
Graphics cursor input.  If a file is given then the cursor input is taken
from the file.  If no file is given then the standard graphics cursor will
be used.
.le
.ih
DESCRIPTION
A line of image data and the profile model for the line is graphed.
The model is graphed with a dashed line.  The graph may be then expanded,
manipulated, and printed with the standard cursor mode commands.
.ih
EXAMPLES
To plot the model fit for image sample for image line 400:

	cl> msplot sample 400
.ih
SEE ALSO
modellist
.endhelp
