.help quadscale Aug01 noao.imred.quadred
.ih
NAME
quadscale -- Scale amplifier sections by separate gains
.ih
USAGE
quadscale input output
.ih
PARAMETERS
.ls input
Input image in \fBquadformat\fR to be scaled.
.le
.ls output
Output scaled image in \fBquadformat\fR.
.le
.ls gain11 = 1., gain12 = 1., gain21 = 1., gain22 = 1.
Gain factors for each quadrant.
.le
.ls operation = "multiply" (multiply|divide)
The operation to apply with the gains.
.le
.ih
DESCRIPTION
This task multiplies or divides by gain factors for each amplifier in
\fBquadformat\fR.
.ih
EXAMPLES

1. To multiply by different gain factors.

.nf
    qu> quadscale quad0072 test gain11=1.2 gain12=1.3 gain21=1.4
.fi
.ih
SEE ALSO
quadformat
.endhelp
