.help asirestore Dec98 "Image Interpolator Package"
.ih
NAME
asirestore -- restore interpolant
.ih
SYNOPSIS
asirestore (asi, interpolant)

.nf
    pointer	asi		#O interpolant descriptor
    real	interpolant[]	#I array containing interpolant
.fi
.ih
ARGUMENTS
.ls asi   
Pointer to the interpolant descriptor structure.
.le
.ls interpolant
Array containing the interpolant. The length of interpolant can be determined
by a call to ASIGETI.
.le

.nf
		len_interpolant = asigeti (asi, II_ASINSAVE)
.fi
.ih
DESCRIPTION
ASIRESTORE allocates space for the interpolant descriptor and restores the
parameters and coefficients stored in the interpolant array to a structure
for use with ASIEVAL, ASIVECTOR, ASIDER and ASIGRL.
.ih
NOTES
.ih
SEE ALSO
asisave
.endhelp
