05101520-3-2-101

(x10^{-2})

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_0058_00_mef.cat lfsr_0059_00_mef.cat lfsr_0060_00_mef.cat lfsr_0061_00_mef.cat lfsr_0062_00_mef.cat lfsr_0063_00_mef.cat lfsr_0064_00_mef.cat lfsr_0065_00_mef.cat lfsr_0066_00_mef.cat lfsr_0067_00_mef.cat lfsr_0068_00_mef.cat lfsr_0069_00_mef.cat lfsr_0070_00_mef.cat lfsr_0071_00_mef.cat lfsr_0072_00_mef.cat lfsr_0073_00_mef.cat lfsr_0074_00_mef.cat lfsr_0075_00_mef.cat lfsr_0076_00_mef.cat lfsr_0077_00_mef.cat lfsr_0078_00_mef.cat lfsr_0079_00_mef.cat