05101520-3-2-101

(x10^{-2})

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_0080_00_mef.cat lfsr_0081_00_mef.cat lfsr_0082_00_mef.cat lfsr_0083_00_mef.cat lfsr_0084_00_mef.cat lfsr_0085_00_mef.cat lfsr_0086_00_mef.cat lfsr_0087_00_mef.cat lfsr_0088_00_mef.cat lfsr_0089_00_mef.cat lfsr_0090_00_mef.cat lfsr_0091_00_mef.cat lfsr_0092_00_mef.cat lfsr_0093_00_mef.cat lfsr_0094_00_mef.cat lfsr_0095_00_mef.cat lfsr_0096_00_mef.cat lfsr_0097_00_mef.cat lfsr_0098_00_mef.cat lfsr_0099_00_mef.cat lfsr_0100_00_mef.cat lfsr_0101_00_mef.cat