05101520-1012

(x10^{-2})

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_0102_00_mef.cat lfsr_0103_00_mef.cat lfsr_0104_00_mef.cat lfsr_0105_00_mef.cat lfsr_0106_00_mef.cat lfsr_0107_00_mef.cat lfsr_0108_00_mef.cat lfsr_0109_00_mef.cat lfsr_0110_00_mef.cat lfsr_0111_00_mef.cat lfsr_0112_00_mef.cat lfsr_0113_00_mef.cat lfsr_0114_00_mef.cat lfsr_0115_00_mef.cat lfsr_0116_00_mef.cat lfsr_0117_00_mef.cat lfsr_0118_00_mef.cat lfsr_0119_00_mef.cat lfsr_0120_00_mef.cat lfsr_0121_00_mef.cat lfsr_0122_00_mef.cat lfsr_0123_00_mef.cat