05101520-2024

(x10^{-2})

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_2592_00_mef.cat lfsr_2593_00_mef.cat lfsr_2594_00_mef.cat lfsr_2595_00_mef.cat lfsr_2596_00_mef.cat lfsr_2597_00_mef.cat lfsr_2598_00_mef.cat lfsr_2599_00_mef.cat lfsr_2600_00_mef.cat lfsr_2601_00_mef.cat lfsr_2602_00_mef.cat lfsr_2628_00_mef.cat lfsr_2629_00_mef.cat lfsr_2630_00_mef.cat lfsr_2631_00_mef.cat lfsr_2632_00_mef.cat lfsr_2633_00_mef.cat lfsr_2634_00_mef.cat lfsr_2635_00_mef.cat lfsr_2636_00_mef.cat lfsr_2637_00_mef.cat lfsr_2638_00_mef.cat