Instrument A1: distortion map -00°08' -00°06' -00°04' -00°02' -00°00' +00°02' +00°04' +00°06' +00°06'-00°07' -00°07'-00°05' -00°05'-00°03' -00°03'-00°01' -00°01'+00°01' +00°01'+00°03' +00°03'+00°05' +00°05'+00°07' +00°07' 1.595

1.600

1.605

1.610

1.615

(x10^{-1})

arcsec pixel scale-0.50.00.5

%