0102030 -0.10

-0.05

0.00

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_1487_01_mef.cat lfsr_1487_02_mef.cat lfsr_1487_03_mef.cat lfsr_1488_01_mef.cat lfsr_1488_02_mef.cat lfsr_1488_03_mef.cat lfsr_1489_01_mef.cat lfsr_1489_02_mef.cat lfsr_1489_03_mef.cat lfsr_1490_01_mef.cat lfsr_1490_02_mef.cat lfsr_1490_03_mef.cat lfsr_1491_01_mef.cat lfsr_1491_02_mef.cat lfsr_1491_03_mef.cat lfsr_1492_01_mef.cat lfsr_1492_02_mef.cat lfsr_1492_03_mef.cat lfsr_1493_01_mef.cat lfsr_1493_02_mef.cat lfsr_1493_03_mef.cat lfsr_1494_01_mef.cat lfsr_1494_02_mef.cat lfsr_1494_03_mef.cat lfsr_1495_01_mef.cat lfsr_1495_02_mef.cat lfsr_1495_03_mef.cat lfsr_1496_01_mef.cat lfsr_1496_02_mef.cat lfsr_1496_03_mef.cat lfsr_1497_01_mef.cat lfsr_1497_02_mef.cat lfsr_1497_03_mef.cat