0102030 -0.10

-0.05

0.00

0.05

Group #1 / Instrument P1: Zero-point corrections Field #

ΔZP [mag] lfsr_1148_01_mef.cat lfsr_1149_01_mef.cat lfsr_1149_02_mef.cat lfsr_1149_03_mef.cat lfsr_1150_01_mef.cat lfsr_1150_02_mef.cat lfsr_1150_03_mef.cat lfsr_1151_01_mef.cat lfsr_1151_02_mef.cat lfsr_1151_03_mef.cat lfsr_1152_01_mef.cat lfsr_1152_02_mef.cat lfsr_1152_03_mef.cat lfsr_1153_01_mef.cat lfsr_1153_02_mef.cat lfsr_1153_03_mef.cat lfsr_1154_01_mef.cat lfsr_1154_02_mef.cat lfsr_1154_03_mef.cat lfsr_1155_01_mef.cat lfsr_1155_02_mef.cat lfsr_1155_03_mef.cat lfsr_1156_01_mef.cat lfsr_1156_02_mef.cat lfsr_1156_03_mef.cat lfsr_1157_01_mef.cat lfsr_1157_02_mef.cat lfsr_1157_03_mef.cat lfsr_1158_01_mef.cat lfsr_1158_02_mef.cat lfsr_1158_03_mef.cat lfsr_1159_01_mef.cat lfsr_1159_02_mef.cat lfsr_1159_03_mef.cat