         180           3
   10.0017556694477        7.47970094465040        5.00905956241394     
   10.6038555460450        10.1670387605478        10.3369130285468     
 -4.846095795563341E-004  0.000000000000000E+000
  0.985321290450211       0.000000000000000E+000
  0.982535930467200       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
