         180           8
   8.64021120981995        7.78702704513913        7.11148544322224     
   6.37648977056200        5.59642086225531        4.81823388043154     
   4.02874832267229        3.36559018656685     
   3.96873741502284        3.91549636851560        3.95984797307371     
   3.97623038315784        3.93230167549781        3.84632021534449     
   3.74602930887703        3.70501360113287     
 -9.267615447794754E-003  0.000000000000000E+000
   1.00887411123849       0.000000000000000E+000
   1.01294860761253       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
