         180           8
   8.34501478968731        7.55247313519269        6.84162124146563     
   6.14227686552535        5.37650889033219        4.61741127150146     
   3.89762738359453        3.21054009884231     
   4.04187188190141        3.98931725171033        3.97010841386930     
   3.93424585021303        3.94634334369186        3.91485985491949     
   3.82733174090104        3.67158357872447     
 -9.279764375491922E-003  0.000000000000000E+000
   1.00861417029191       0.000000000000000E+000
   1.01314359723978       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
