         180           8
   8.81940276023662        8.00439792391269        7.25390668020802     
   6.43841763655013        5.68991825764210        4.95953819737137     
   4.16424088310319        3.43553419037034     
   3.80328479225538        3.80923352823216        3.85313333135209     
   3.85932945167410        3.84645139022486        3.84656351527771     
   3.77833975619144        3.60675915617823     
 -9.296548832390944E-003  0.000000000000000E+000
   1.00878446237295       0.000000000000000E+000
   1.01283715688111       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
