         180           8
   8.36050638199260        7.50307488273576        6.75294084988982     
   5.93913242961329        5.12993360003059        4.43125000315753     
   3.76563980013710        3.13378227061070     
   4.37047442077408        3.96622897021121        3.78831831003482     
   3.65499435915491        3.55147385795919        3.53340866613774     
   3.56738295004062        3.59187234747219     
 -9.406930741511421E-003  0.000000000000000E+000
   1.00917031689395       0.000000000000000E+000
   1.01300144746378       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
