         180           8
   1.55909678559060        1.28253978255346        1.06328207622629     
  0.877431255311706       0.745231039415657       0.608941110815469     
  0.499456512064138       0.466126485064626     
   6.66123161084989        6.62354327507163        6.69056775112478     
   6.84379243421029        6.99868002331115        7.14943997751275     
   7.31615028781425        7.45809487655791     
 -1.036116156899259E-002  0.000000000000000E+000
   1.00795226657888       0.000000000000000E+000
   1.01192598059728       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
