         180           8
  -1.05012281836941       -1.22013771374075       -1.38767370996561     
  -1.55110598730032       -1.66266679090466       -1.79533819838318     
  -1.91191602935322       -1.97181712294746     
   6.89016931841041        7.03584752164828        7.17736144600501     
   7.31279535168241        7.51244217046835        7.73550102086214     
   7.97310645049811        8.12919775551054     
 -1.026942527683912E-002  0.000000000000000E+000
   1.00739606171376       0.000000000000000E+000
   1.01169580750780       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
