         180           8
   4.43032722105345        3.84996739523715        3.14174742182331     
   2.43418753713883        1.75637296760702        1.01306443826704     
  0.282131870447268      -0.400818097014974     
   7.39852048249304        7.41354655619868        7.38064061729548     
   7.33567160680264        7.27682019453675        7.21323747478949     
   7.10378304468002        7.00123414575606     
 -1.043268574934734E-002  0.000000000000000E+000
   1.00765147840194       0.000000000000000E+000
   1.01181286203446       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
