         180           8
   4.71129067522917        3.97473979526578        3.28278014661186     
   2.56268612239440        1.87815847507863        1.16533986991653     
  0.414231695091710      -0.305821148434582     
   7.46399593370600        7.42210254006370        7.40059130886331     
   7.34733712342892        7.34582821451797        7.30818869316361     
   7.27151559505911        7.21126658563873     
 -1.046040940826805E-002  0.000000000000000E+000
   1.00777707073249       0.000000000000000E+000
   1.01207133522673       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
