         180           8
   6.25972500405024        5.70569034499572        5.15163382021934     
   4.51193551633588        4.37219064967284        1.77506619602062     
  -10.0233671322633       -17.5558454061601     
   2.55898310705262        2.51559448989658        2.59519084243178     
   2.33598434322393        2.05061254199902        2.93275514728218     
   15.3029942915520        86.6961752452184     
 -6.185510864018472E-004  0.000000000000000E+000
  0.985870115101212       0.000000000000000E+000
  0.983013768590901       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
