         180           8
   4.48435936266571        3.97994838905353        3.42935617920527     
   2.93494904024712        2.52005324451475        2.89856944938045     
   16.1779350793400        99.2053135094107     
   1.62824972738444        1.27970437885253        1.11199097650310     
  0.686207499034127       0.310697752140299      -0.329136858832043     
  -11.3790933182112       -82.0532215679604     
 -1.084881922446649E-002  0.000000000000000E+000
   1.00861080403998       0.000000000000000E+000
   1.01314852780702       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
