         180           3
   7.44325166236737        5.39979014462069        3.47124022715491     
   39.0246874192480        41.6422252434066        43.8728328540003     
 -6.797665296768100E-004  0.000000000000000E+000
  0.986423990316515       0.000000000000000E+000
  0.983717353244458       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
