         180           8
   5.34159722295206        5.05767691500167        4.63373248117740     
   4.20747675276661        3.88711299856459        3.49111544545090     
   3.11327140354795        2.75531862990852     
   38.2375507640640        38.5762429091233        39.0856182179497     
   39.5517442360454        39.9900721144566        40.4038253190899     
   40.7738133149612        41.1907891045687     
 -1.076554023507842E-002  0.000000000000000E+000
   1.00924635538128       0.000000000000000E+000
   1.01313278647661       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
