         180           8
   4.61566557840013        4.23640774909301        3.91551880893447     
   3.64437910493401        3.30480636850568        2.96265160964502     
   2.58182003507321        2.24748458846467     
   33.2264095362236        33.1121934796016        33.2016747868359     
   33.7583810149816        34.3741886915351        34.9028591378393     
   35.5641216182722        36.1937816957948     
 -1.076956868243205E-002  0.000000000000000E+000
   1.00850269262679       0.000000000000000E+000
   1.01316857410719       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
