         180           8
   3.84718153434105        3.46281334758770        3.09945017575469     
   2.76963570197801        2.42368882773204        2.04999312718147     
   1.75006339281790        1.46268550530500     
   33.5723893031038        33.3487226199948        33.1887575430487     
   33.0722557642260        32.9901668242406        32.8763364201357     
   32.8070725833164        32.8811747127054     
 -1.075231796742407E-002  0.000000000000000E+000
   1.00807313199990       0.000000000000000E+000
   1.01310213999374       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
