         180           8
   4.86400120194002        4.38505108495098        3.93212435070301     
   3.55934939163160        3.23928389035934        2.93319447735985     
   2.74484118578763        2.38631045583751     
   33.1700919978028        33.0699133680570        32.9187949583268     
   32.7887707027078        32.7626168787671        32.8336524697121     
   32.9298512591049        33.1086160625787     
 -1.062419031849199E-002  0.000000000000000E+000
   1.00797839593182       0.000000000000000E+000
   1.01295928507258       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
