         180           8
   8.01423373075722        7.34991304878307        6.70976834386392     
   6.02119665991060        5.31543919025652        4.66022999418045     
   3.95934826515363        3.50062303586619     
   35.0636543751835        34.9205866801440        34.9152501325556     
   34.8633116864468        34.8076471652895        34.7543948140423     
   34.7024244020280        34.6021719195537     
 -1.080604779939841E-002  0.000000000000000E+000
   1.00827235695240       0.000000000000000E+000
   1.01229833060102       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
