         180           3
   4.64112026562065        3.36963027372431        2.59000865933116     
   32.5313458868312        33.0419396231855        33.5484639270507     
 -7.027160652644157E-004  0.000000000000000E+000
  0.986811273523222       0.000000000000000E+000
  0.983822208482685       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
