         180           8
   5.16057265015403        4.62170828567354        4.16727604965575     
   3.80917214711134        3.48344084045439        3.09066637535297     
   2.83186081070867        2.42944711975572     
   31.3618848522744        31.1258875300785        31.1236579133204     
   31.1137009489229        31.1454249772176        31.1777289062362     
   31.0870679184303        31.2643331950352     
 -1.117281317584391E-002  0.000000000000000E+000
   1.00896704822460       0.000000000000000E+000
   1.01299675053438       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
