         180           8
   6.05304294971729        5.73389619635416        5.29108187872145     
   4.93921523919650        4.64338430824944        4.31241737111547     
   3.98485355840611        3.69151456153228     
   31.7243690369993        31.5804948826585        31.4885228482154     
   31.3659550094243        31.2180555602276        31.0953695105846     
   31.1143992574356        31.3623804868811     
 -1.133330760504148E-002  0.000000000000000E+000
   1.00879825724585       0.000000000000000E+000
   1.01335077887573       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
