         180           8
  -1.11955992201792       -1.75102354953545       -2.20551087017099     
  -2.69974720047798       -3.28009022814540       -3.81371953332437     
  -4.16757824821892       -4.53489671989611     
  -3.61088785873962       -3.34379323612955       -3.24247770402022     
  -3.12910012440064       -3.02544269709227       -2.90865593394215     
  -2.80887914468002       -2.60748590306904     
 -1.402055442812521E-003  0.000000000000000E+000
  0.987785625273613       0.000000000000000E+000
  0.985444110757424       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
