         180           8
 -0.739966373003077       -1.20509798257661       -1.42181826444436     
  -1.72674027564296       -2.24093354478531       -2.73502724527556     
  -3.03052139442081       -3.37849566714073     
  -3.45874785984109       -3.56461280644217       -3.77135175864146     
  -3.92338764918841       -4.08415530603746       -4.24659788113423     
  -4.39183374818804       -4.42556313142283     
 -1.241090937994279E-002  0.000000000000000E+000
   1.00988122261945       0.000000000000000E+000
   1.01461549634149       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
