         180           8
 -0.616414379141560       -1.23555598910436       -1.92627823361445     
  -2.51557726050043       -3.07097540828324       -3.71481059431099     
  -4.23830703441674       -4.66401761960029     
  -3.54859509712828       -3.57544448829742       -3.48398047577564     
  -3.38365038388634       -3.33197184632710       -3.22124488350817     
  -3.02954076587850       -2.88337338397044     
 -1.391143512625653E-003  0.000000000000000E+000
  0.987768445786207       0.000000000000000E+000
  0.985525310143971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
