         180           8
  -1.29320411034662       -2.04876550162691       -2.71144081890171     
  -3.33750140986147       -3.84669594561772       -4.27554033454341     
  -4.65310771828091       -4.76169663771094     
  -2.91427357885887       -2.86740152577032       -2.78358966621798     
  -2.72443896031490       -2.70983383819477       -2.63696055388264     
  -2.70214178210712       -3.13538575762396     
 -1.321647538932778E-003  0.000000000000000E+000
  0.987988603805878       0.000000000000000E+000
  0.985542154435971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
