         180           8
 -0.139582734257582      -0.582565375167115      -0.993361652773977     
  -1.36517118373484       -1.72395440937365       -2.11024320722311     
  -2.43229659700794       -2.62992499838343     
  -3.05631602353961       -3.26855486483135       -3.47451310422950     
  -3.68007797940815       -3.90264318122868       -4.13711609276012     
  -4.31201014547205       -4.54644684578896     
 -1.245857079839985E-002  0.000000000000000E+000
   1.01003556516491       0.000000000000000E+000
   1.01514539721415       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
