         180           8
   5.60081945575294        4.89419760737445        4.25263342830007     
   3.55794285905020        2.92490885208134        2.47857869239930     
   1.98597146171603        1.44861866512981     
 -0.690346340136385       -1.01768662453165       -1.11672701462648     
  -1.23203880197998       -1.26801525628303       -1.07078883006655     
 -0.800956899250389      -0.590219133868059     
 -1.292094150885369E-003  0.000000000000000E+000
  0.987588342837374       0.000000000000000E+000
  0.985250822248183       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
