         180           8
   3.27460418874026        2.52246379563287        1.88731443260925     
   1.18411202776230       0.473884488721071      -0.206850874995342     
 -0.852730159057461       -1.57704833923987     
  -1.13623512950577       -1.28359815147993       -1.29026530389874     
  -1.32498794326704       -1.34499291900235       -1.28461153010007     
  -1.20732660119793       -1.25496452762237     
 -1.273754798617946E-002  0.000000000000000E+000
   1.00977516938739       0.000000000000000E+000
   1.01516931059505       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
