         180           8
   5.41398415305674        4.63732349833844        3.91699758459341     
   3.17101200898938        2.44094839047592        1.67304985799931     
  0.948191309728912       0.325432965822121     
  -1.06652313475363       -1.29693430447907       -1.41832466156047     
  -1.51170503798543       -1.53741124784611       -1.59967041125485     
  -1.71968190992657       -1.80298871644691     
 -1.267452141422480E-002  0.000000000000000E+000
   1.01049059001150       0.000000000000000E+000
   1.01468898089988       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
