         180           8
  -2.80921033645167       -3.13501362666779       -3.53420046996621     
  -3.90285992871682       -4.25657843081746       -4.55572341959124     
  -4.81378645604135       -5.21406081131381     
  -2.27651942609552       -2.46425971195787       -2.83618539843081     
  -3.35669257072909       -3.66383410756004       -3.91130292810792     
  -4.13065698972606       -4.44783134513692     
 -1.237087982366347E-002  0.000000000000000E+000
   1.01016390258983       0.000000000000000E+000
   1.01412031595582       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
