         180           8
  0.346944437788443       3.966682691759873E-002 -0.117565643038151     
 -0.254046384462795      -0.406123768831683      -0.525320462278271     
 -0.619605980337021      -0.688009671908127     
  -3.44076257037727       -3.27825104917722       -3.06161835029991     
  -2.80208521454364       -2.55176447401473       -2.33922488735708     
  -2.10476713191141       -1.89888279138090     
 -1.236880393088382E-002  0.000000000000000E+000
   1.01040035402046       0.000000000000000E+000
   1.01433631509872       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
