         180           8
 -0.371534036156556      -0.788555731684953       -1.19222132639495     
  -1.58617501088565       -1.97771584985346       -2.33289028750144     
  -2.61333508728174       -2.77308246126270     
  -2.46223276222872       -2.60389526137518       -2.80080545422800     
  -3.05465565264392       -3.53760289727549       -4.14485394910005     
  -4.57252082765303       -4.86891284013555     
 -1.232319368378182E-002  0.000000000000000E+000
   1.01013499269462       0.000000000000000E+000
   1.01493468967062       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
