         180           8
 -0.243674760728559      -0.798178661322144       -1.45264212449660     
  -2.10489131028565       -2.74068761151043       -3.37757390318829     
  -4.00996586395345       -4.59649643538116     
   2.20040396375540        2.65242167637091        3.25657519919759     
   3.65386901283997        3.96906573261776        4.48186650808831     
   5.09202276217940        5.66366072347567     
 -1.251667654526784E-002  0.000000000000000E+000
   1.01014926045601       0.000000000000000E+000
   1.01490879385644       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
