         180           8
 -0.985479614276717       -1.41957309632158       -1.80717659280917     
  -2.12686064543608       -2.50018734194780       -2.86125161988573     
  -3.11138103249406       -3.31789287304818     
  -1.26358457687488       -1.50744382186005       -1.73414178941664     
  -1.95122365896007       -2.15753265475365       -2.36223701955822     
  -2.51865449413707       -2.65752742932493     
 -1.201407381175959E-002  0.000000000000000E+000
   1.01083153566286       0.000000000000000E+000
   1.01416703798739       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
