         180           8
 -0.401452314118577      -0.936265330716590       -1.42675877604624     
  -1.86589837195114       -2.26620760456881       -2.63261321576410     
  -2.90408792505103       -3.16987523212219     
  -1.77583533567471       -1.94123504239852       -2.09232853137327     
  -2.26201538945734       -2.43640136823009       -2.60235578964451     
  -2.77646473313865       -2.96722250351665     
 -1.195265035568633E-002  0.000000000000000E+000
   1.01066341693222       0.000000000000000E+000
   1.01391049231442       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
