         180           8
 -0.229129047173163      -0.777309191660984       -1.18321490530292     
  -1.57418228421103       -1.87470672131856       -2.21094195198786     
  -2.51506352311805       -2.84210494623733     
  -1.21520791156842       -1.45211144478894       -1.68547538824875     
  -1.88713384982561       -2.12265546091867       -2.31320335580144     
  -2.44374255493674       -2.66208921363378     
 -1.194825356625528E-002  0.000000000000000E+000
   1.01067110114748       0.000000000000000E+000
   1.01422521670195       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
