CA13743_6_fits_supp/IPx_y.def:        60.000  tolerance
CA13743_6_fits_supp/JIx_y.def:        60.000  tolerance
CA13743_6_fits_supp/JKx_y.def:       100.000  tolerance
CA13744_no_I_supp/IPx_y.def:        60.000  tolerance
CA13744_no_I_supp/JIx_y.def:        60.000  tolerance
CA13744_no_I_supp/JKx_y.def:       100.000  tolerance
CA13745/IPx_y.def:        60.000  tolerance
CA13745/JIx_y.def:        60.000  tolerance
CA13745/JKx_y.def:       100.000  tolerance
CA13746/IPx_y.def:        60.000  tolerance
CA13746/JIx_y.def:        60.000  tolerance
CA13746/JKx_y.def:       100.000  tolerance
CA13747/IPx_y.def:        60.000  tolerance
CA13747/JIx_y.def:        60.000  tolerance
CA13747/JKx_y.def:       100.000  tolerance
CA13749/IPx_y.def:        60.000  tolerance
CA13749/JIx_y.def:        60.000  tolerance
CA13749/JKx_y.def:       100.000  tolerance
CA13750/IPx_y.def:        60.000  tolerance
CA13750/JIx_y.def:        60.000  tolerance
CA13750/JKx_y.def:       100.000  tolerance
CA13752/IPx_y.def:        60.000  tolerance
CA13752/JIx_y.def:        60.000  tolerance
CA13752/JKx_y.def:       100.000  tolerance
CA13753/IPx_y.def:        60.000  tolerance
CA13753/JIx_y.def:        60.000  tolerance
CA13753/JKx_y.def:       100.000  tolerance
CA13754/IPx_y.def:        60.000  tolerance
CA13754/JIx_y.def:        60.000  tolerance
CA13754/JKx_y.def:       100.000  tolerance
CA13756/IPx_y.def:        60.000  tolerance
CA13756/JIx_y.def:        60.000  tolerance
CA13756/JKx_y.def:       100.000  tolerance
CA13757/IPx_y.def:        60.000  tolerance
CA13757/JIx_y.def:        60.000  tolerance
CA13757/JKx_y.def:       100.000  tolerance
CA13758/IPx_y.def:        60.000  tolerance
CA13758/JIx_y.def:        60.000  tolerance
CA13758/JKx_y.def:       100.000  tolerance
CA13760/IPx_y.def:        60.000  tolerance
CA13760/JIx_y.def:        60.000  tolerance
CA13760/JKx_y.def:       100.000  tolerance
CA13761/IPx_y.def:        60.000  tolerance
CA13761/JIx_y.def:        60.000  tolerance
CA13761/JKx_y.def:       100.000  tolerance
CA13762/IPx_y.def:        60.000  tolerance
CA13762/JIx_y.def:        60.000  tolerance
CA13762/JKx_y.def:       100.000  tolerance
CA13763/IPx_y.def:        60.000  tolerance
CA13763/JIx_y.def:        60.000  tolerance
CA13763/JKx_y.def:       100.000  tolerance
CA13765/IPx_y.def:        60.000  tolerance
CA13765/JIx_y.def:        60.000  tolerance
CA13765/JKx_y.def:       100.000  tolerance
CA13766/IPx_y.def:        60.000  tolerance
CA13766/JIx_y.def:        60.000  tolerance
CA13766/JKx_y.def:       100.000  tolerance
CA13767/IPx_y.def:        60.000  tolerance
CA13767/JIx_y.def:        60.000  tolerance
CA13767/JKx_y.def:       100.000  tolerance
