         180           8
   1.13346925817421       0.514782874490121      -0.141795587110870     
 -0.810283261832275       -1.48615248412256       -2.16322557262477     
  -2.84395511757162       -3.38983428077132     
   1.75332819332226        1.94484222682029        1.98924185231118     
   2.01285768693888        1.97401880300138        1.94420317805834     
   1.88694401800195        1.79726108395115     
 -1.264276478453360E-002  0.000000000000000E+000
   1.00999859507301       0.000000000000000E+000
   1.01449067975265       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
