         180           8
   2.74734677884135        2.25708517141990        1.60248112510240     
   1.03878399920151       0.411345254138284      -0.230246726599405     
 -0.902491041322330       -1.54908537652206     
   1.42602116459252        1.40231021906282        1.32636419248975     
   1.34817823079296        1.45579778486494        1.45943121496886     
   1.41514020933559        1.35235402268695     
 -1.253923987227667E-002  0.000000000000000E+000
   1.01034076500741       0.000000000000000E+000
   1.01456187747712       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
